\documentclass[kind=ENG,a4j,bachelor,landscape,viewer,color,check]{edb-syl}
\def\年度{2011}
\def\和年度{23}
\begin{document}

\Englishfalse
%%%% 215472:216046
\begin{edb:lecture}%
\EdbEID{216046}\EdbEOID{547040}%
\JabeeEfalse%
\JabeeRfalse%
\包含false%
\授業ID{215472:216046}%
\授業概要種別{166220}%
\名称{生産管理}{Production Control}%
\担当教員{\所属肩書氏名{}{非常勤講師}{\EdbSMG{佐野}{}{稔}}}%
\開講学期{4年(前期)}%
\履修種別{選択}%
\EdbColDef{edb:lecture.goal}{1}{E}{\EdbAlert{生産管理の各手法を概略理解する．}}%
\EdbColDef{edb:lecture.goal}{1}{J}{生産管理の各手法を概略理解する．}%
\EdbColDef{edb:lecture.goal}{2}{E}{\EdbAlert{企業マネジメントの中での位置づけを概略理解する．}}%
\EdbColDef{edb:lecture.goal}{2}{J}{企業マネジメントの中での位置づけを概略理解する．}%
\EdbColDef{edb:lecture.plan}{1}{E}{\EdbAlert{序}}%
\EdbColDef{edb:lecture.plan}{1}{J}{序}%
\EdbColDef{edb:lecture.plan}{2}{E}{\EdbAlert{生産管理体系}}%
\EdbColDef{edb:lecture.plan}{2}{J}{生産管理体系}%
\EdbColDef{edb:lecture.plan}{3}{E}{\EdbAlert{品質管理総論}}%
\EdbColDef{edb:lecture.plan}{3}{J}{品質管理総論}%
\EdbColDef{edb:lecture.plan}{4}{E}{\EdbAlert{工程管理総論}}%
\EdbColDef{edb:lecture.plan}{4}{J}{工程管理総論}%
\EdbColDef{edb:lecture.plan}{5}{E}{\EdbAlert{工程管理各論}}%
\EdbColDef{edb:lecture.plan}{5}{J}{工程管理各論}%
\EdbColDef{edb:lecture.plan}{6}{E}{\EdbAlert{原価管理}}%
\EdbColDef{edb:lecture.plan}{6}{J}{原価管理}%
\EdbColDef{edb:lecture.plan}{7}{E}{\EdbAlert{安全管理，トヨタ生産方式}}%
\EdbColDef{edb:lecture.plan}{7}{J}{安全管理，トヨタ生産方式}%
\EdbColDef{edb:lecture.plan}{8}{E}{\EdbAlert{環境管理}}%
\EdbColDef{edb:lecture.plan}{8}{J}{環境管理}%
\EdbColDef{edb:lecture.unit}{1}{E}{1}%
\EdbColDef{edb:lecture.unit}{1}{J}{1}%
\EdbColDef{edb:lecture.target}{1}{E}{\EdbAlert{企業マネジメント(工業経営)の中で，「生産管理」がどう役割を果たしているかを理解する．}}%
\EdbColDef{edb:lecture.target}{1}{J}{企業マネジメント(工業経営)の中で，「生産管理」がどう役割を果たしているかを理解する．}%
\EdbColDef{edb:lecture.outline}{1}{E}{\EdbAlert{「生産管理」のツール手法の概略紹介とともに，企業マネジメントの効率的な遂行の手段としての位置づけについて講義する．}}%
\EdbColDef{edb:lecture.outline}{1}{J}{「生産管理」のツール手法の概略紹介とともに，企業マネジメントの効率的な遂行の手段としての位置づけについて講義する．}%
\EdbColDef{edb:lecture.notice}{1}{E}{\EdbAlert{毎講義終了後，簡単な事前試問(3問程度)について，解答ペーパーの提出を求める．}}%
\EdbColDef{edb:lecture.notice}{1}{J}{毎講義終了後，簡単な事前試問(3問程度)について，解答ペーパーの提出を求める．}%
\EdbColDef{edb:lecture.evaluation}{1}{E}{\EdbAlert{毎講義時の試問解答ペーパーの提出(出席点60点満点-白紙は不可)及びその試問正解点40点満点で，480点以上を「可」とする．}}%
\EdbColDef{edb:lecture.evaluation}{1}{J}{毎講義時の試問解答ペーパーの提出(出席点60点満点-白紙は不可)及びその試問正解点40点満点で，480点以上を「可」とする．}%
\EdbColDef{edb:lecture.student}{1}{@}{12628}%
\EdbColDef{edb:lecture.student}{1}{E}{Able to be taken by only specified class(es)}%
\EdbColDef{edb:lecture.student}{1}{J}{開講コース学生のみ履修可能}%
\EdbColDef{edb:lecture.textbook}{1}{E}{\EdbAlert{毎講義時に，プリントその他で提示する．}}%
\EdbColDef{edb:lecture.textbook}{1}{J}{毎講義時に，プリントその他で提示する．}%
\EdbColDef{edb:lecture.reference}{1}{E}{\EdbAlert{「(新版)よくわかる生産管理のしくみ」 日本能率協会}}%
\EdbColDef{edb:lecture.reference}{1}{J}{「(新版)よくわかる生産管理のしくみ」 日本能率協会}%
\EdbColDef{edb:lecture.reference}{2}{E}{\EdbAlert{「生産管理(経営指導者シリーズ)」 企業経営通信学院}}%
\EdbColDef{edb:lecture.reference}{2}{J}{「生産管理(経営指導者シリーズ)」 企業経営通信学院}%
\EdbColDef{edb:lecture.reference}{3}{E}{\EdbAlert{「生産管理便覧」 丸善}}%
\EdbColDef{edb:lecture.reference}{3}{J}{「生産管理便覧」 丸善}%
\EdbColDef{edb:lecture.contact}{1}{J}{\連絡先個人{}{佐{\EdbZSp}野{\EdbZSp} {\EdbZSp}稔{\EdbZSp}({\EdbZSp}T{\EdbZSp}e{\EdbZSp}l{\EdbZSp} {\EdbZSp}\&{\EdbZSp} {\EdbZSp}F{\EdbZSp}a{\EdbZSp}x{\EdbZSp}:{\EdbZSp} {\EdbZSp}0{\EdbZSp}8{\EdbZSp}8{\EdbZSp}-{\EdbZSp}6{\EdbZSp}9{\EdbZSp}2{\EdbZSp}-{\EdbZSp}2{\EdbZSp}7{\EdbZSp}5{\EdbZSp}5{\EdbZSp}，{\EdbZSp}E{\EdbZSp}-{\EdbZSp}m{\EdbZSp}a{\EdbZSp}i{\EdbZSp}l{\EdbZSp}:{\EdbZSp} {\EdbZSp}m{\EdbZSp}s{\EdbZSp}1{\EdbZSp}2{\EdbZSp}1{\EdbZSp}2{\EdbZSp}@{\EdbZSp}p{\EdbZSp}r{\EdbZSp}o{\EdbZSp}.{\EdbZSp}o{\EdbZSp}d{\EdbZSp}n{\EdbZSp}.{\EdbZSp}n{\EdbZSp}e{\EdbZSp}.{\EdbZSp}j{\EdbZSp}p{\EdbZSp}){\EdbZSp}}{}}%
\end{edb:lecture}%

\Englishtrue
%%%% 215472:216046
\begin{edb:lecture}%
\EdbEID{216046}\EdbEOID{547040}%
\JabeeEfalse%
\JabeeRfalse%
\包含false%
\授業ID{215472:216046}%
\授業概要種別{166220}%
\名称{Production Control}{生産管理}%
\担当教員{\所属肩書氏名{}{Part-time Lecturer}{\EdbGMS{Minoru}{}{Sano}}}%
\開講学期{4th-year(1st semester)}%
\履修種別{selection}%
\EdbColDef{edb:lecture.goal}{1}{J}{生産管理の各手法を概略理解する．}%
\EdbColDef{edb:lecture.goal}{1}{E}{\EdbAlert{生産管理の各手法を概略理解する．}}%
\EdbColDef{edb:lecture.goal}{2}{J}{企業マネジメントの中での位置づけを概略理解する．}%
\EdbColDef{edb:lecture.goal}{2}{E}{\EdbAlert{企業マネジメントの中での位置づけを概略理解する．}}%
\EdbColDef{edb:lecture.plan}{1}{J}{序}%
\EdbColDef{edb:lecture.plan}{1}{E}{\EdbAlert{序}}%
\EdbColDef{edb:lecture.plan}{2}{J}{生産管理体系}%
\EdbColDef{edb:lecture.plan}{2}{E}{\EdbAlert{生産管理体系}}%
\EdbColDef{edb:lecture.plan}{3}{J}{品質管理総論}%
\EdbColDef{edb:lecture.plan}{3}{E}{\EdbAlert{品質管理総論}}%
\EdbColDef{edb:lecture.plan}{4}{J}{工程管理総論}%
\EdbColDef{edb:lecture.plan}{4}{E}{\EdbAlert{工程管理総論}}%
\EdbColDef{edb:lecture.plan}{5}{J}{工程管理各論}%
\EdbColDef{edb:lecture.plan}{5}{E}{\EdbAlert{工程管理各論}}%
\EdbColDef{edb:lecture.plan}{6}{J}{原価管理}%
\EdbColDef{edb:lecture.plan}{6}{E}{\EdbAlert{原価管理}}%
\EdbColDef{edb:lecture.plan}{7}{J}{安全管理，トヨタ生産方式}%
\EdbColDef{edb:lecture.plan}{7}{E}{\EdbAlert{安全管理，トヨタ生産方式}}%
\EdbColDef{edb:lecture.plan}{8}{J}{環境管理}%
\EdbColDef{edb:lecture.plan}{8}{E}{\EdbAlert{環境管理}}%
\EdbColDef{edb:lecture.unit}{1}{J}{1}%
\EdbColDef{edb:lecture.unit}{1}{E}{1}%
\EdbColDef{edb:lecture.target}{1}{J}{企業マネジメント(工業経営)の中で，「生産管理」がどう役割を果たしているかを理解する．}%
\EdbColDef{edb:lecture.target}{1}{E}{\EdbAlert{企業マネジメント(工業経営)の中で，「生産管理」がどう役割を果たしているかを理解する．}}%
\EdbColDef{edb:lecture.outline}{1}{J}{「生産管理」のツール手法の概略紹介とともに，企業マネジメントの効率的な遂行の手段としての位置づけについて講義する．}%
\EdbColDef{edb:lecture.outline}{1}{E}{\EdbAlert{「生産管理」のツール手法の概略紹介とともに，企業マネジメントの効率的な遂行の手段としての位置づけについて講義する．}}%
\EdbColDef{edb:lecture.notice}{1}{J}{毎講義終了後，簡単な事前試問(3問程度)について，解答ペーパーの提出を求める．}%
\EdbColDef{edb:lecture.notice}{1}{E}{\EdbAlert{毎講義終了後，簡単な事前試問(3問程度)について，解答ペーパーの提出を求める．}}%
\EdbColDef{edb:lecture.evaluation}{1}{J}{毎講義時の試問解答ペーパーの提出(出席点60点満点-白紙は不可)及びその試問正解点40点満点で，480点以上を「可」とする．}%
\EdbColDef{edb:lecture.evaluation}{1}{E}{\EdbAlert{毎講義時の試問解答ペーパーの提出(出席点60点満点-白紙は不可)及びその試問正解点40点満点で，480点以上を「可」とする．}}%
\EdbColDef{edb:lecture.student}{1}{@}{12628}%
\EdbColDef{edb:lecture.student}{1}{J}{開講コース学生のみ履修可能}%
\EdbColDef{edb:lecture.student}{1}{E}{Able to be taken by only specified class(es)}%
\EdbColDef{edb:lecture.textbook}{1}{J}{毎講義時に，プリントその他で提示する．}%
\EdbColDef{edb:lecture.textbook}{1}{E}{\EdbAlert{毎講義時に，プリントその他で提示する．}}%
\EdbColDef{edb:lecture.reference}{1}{J}{「(新版)よくわかる生産管理のしくみ」 日本能率協会}%
\EdbColDef{edb:lecture.reference}{1}{E}{\EdbAlert{「(新版)よくわかる生産管理のしくみ」 日本能率協会}}%
\EdbColDef{edb:lecture.reference}{2}{J}{「生産管理(経営指導者シリーズ)」 企業経営通信学院}%
\EdbColDef{edb:lecture.reference}{2}{E}{\EdbAlert{「生産管理(経営指導者シリーズ)」 企業経営通信学院}}%
\EdbColDef{edb:lecture.reference}{3}{J}{「生産管理便覧」 丸善}%
\EdbColDef{edb:lecture.reference}{3}{E}{\EdbAlert{「生産管理便覧」 丸善}}%
\EdbColDef{edb:lecture.contact}{1}{E}{\連絡先個人{}{佐{\EdbZSp}野{\EdbZSp} {\EdbZSp}稔{\EdbZSp}({\EdbZSp}T{\EdbZSp}e{\EdbZSp}l{\EdbZSp} {\EdbZSp}\&{\EdbZSp} {\EdbZSp}F{\EdbZSp}a{\EdbZSp}x{\EdbZSp}:{\EdbZSp} {\EdbZSp}0{\EdbZSp}8{\EdbZSp}8{\EdbZSp}-{\EdbZSp}6{\EdbZSp}9{\EdbZSp}2{\EdbZSp}-{\EdbZSp}2{\EdbZSp}7{\EdbZSp}5{\EdbZSp}5{\EdbZSp}，{\EdbZSp}E{\EdbZSp}-{\EdbZSp}m{\EdbZSp}a{\EdbZSp}i{\EdbZSp}l{\EdbZSp}:{\EdbZSp} {\EdbZSp}m{\EdbZSp}s{\EdbZSp}1{\EdbZSp}2{\EdbZSp}1{\EdbZSp}2{\EdbZSp}@{\EdbZSp}p{\EdbZSp}r{\EdbZSp}o{\EdbZSp}.{\EdbZSp}o{\EdbZSp}d{\EdbZSp}n{\EdbZSp}.{\EdbZSp}n{\EdbZSp}e{\EdbZSp}.{\EdbZSp}j{\EdbZSp}p{\EdbZSp}){\EdbZSp}}{}}%
\end{edb:lecture}%

\end{document}
\end{document}


