\documentclass[kind=ENG,a4j,bachelor,landscape,viewer,color,fascicle]{edb-syl}
\def\年度{2011}
\def\和年度{23}
\def\Fdir{215474}
\def\Ffile{216036}
\def\Fhead{\BILINGUAL{Faculty of Engineering}{工学部}}
\Englishtrue
\begin{document}

\SYLHEAD{\LinkToPDF{list}{\BILINGUAL{Electrical and Electronic Engineering (Day Course)}{電気電子工学科(昼間コース)}}}
%%%% 215474:216036
\begin{edb:lecture}%
\EdbEID{216036}\EdbEOID{556314}%
\JabeeEfalse%
\JabeeRtrue%
\包含false%
\授業ID{215474:216036}%
\授業概要種別{166220}%
\名称{Control Theory (I)}{制御理論1}%
\担当教員{\所属肩書氏名{Electrical Energy Engineering, Department of Electrical and Electronic Engineering}{Associate Professor}{\href{http://pub2.db.tokushima-u.ac.jp/ERD/person/10716/profile-en.html}{\EdbGMS{Takashi}{}{Yasuno}}}}%
\開講学期{2nd-year(2nd semester)}%
\履修種別{required selection (F)}%
\EdbColDef{edb:lecture.goal}{1}{J}{周波数応答特性の表示法およびそれらを用いた安定判別法を習得する．}%
\EdbColDef{edb:lecture.goal}{1}{E}{周波数応答特性の表示法およびそれらを用いた安定判別法を習得する．}%
\EdbColDef{edb:lecture.goal}{2}{J}{制御系の設計仕様および設計法を習得する．}%
\EdbColDef{edb:lecture.goal}{2}{E}{制御系の設計仕様および設計法を習得する．}%
\EdbColDef{edb:lecture.plan}{1}{J}{システム基礎の復習}%
\EdbColDef{edb:lecture.plan}{1}{E}{システム基礎の復習}%
\EdbColDef{edb:lecture.plan}{2}{J}{周波数応答の基礎}%
\EdbColDef{edb:lecture.plan}{2}{E}{周波数応答の基礎}%
\EdbColDef{edb:lecture.plan}{3}{J}{ナイキスト線図(一次遅れ要素，近似微分要素)}%
\EdbColDef{edb:lecture.plan}{3}{E}{ナイキスト線図(一次遅れ要素，近似微分要素)}%
\EdbColDef{edb:lecture.plan}{4}{J}{ナイキスト線図(直列結合系，並列結合系)}%
\EdbColDef{edb:lecture.plan}{4}{E}{ナイキスト線図(直列結合系，並列結合系)}%
\EdbColDef{edb:lecture.plan}{5}{J}{ボード線図の基礎}%
\EdbColDef{edb:lecture.plan}{5}{E}{ボード線図の基礎}%
\EdbColDef{edb:lecture.plan}{6}{J}{ボード線図(比例要素，積分要素，微分要素，一次遅れ要素，一次進み要素)}%
\EdbColDef{edb:lecture.plan}{6}{E}{ボード線図(比例要素，積分要素，微分要素，一次遅れ要素，一次進み要素)}%
\EdbColDef{edb:lecture.plan}{7}{J}{ボード線図(二次遅れ要素，高次要素)}%
\EdbColDef{edb:lecture.plan}{7}{E}{ボード線図(二次遅れ要素，高次要素)}%
\EdbColDef{edb:lecture.plan}{8}{J}{中間試験}%
\EdbColDef{edb:lecture.plan}{8}{E}{中間試験}%
\EdbColDef{edb:lecture.plan}{9}{J}{ナイキストの安定判別法(物理的意味)}%
\EdbColDef{edb:lecture.plan}{9}{E}{ナイキストの安定判別法(物理的意味)}%
\EdbColDef{edb:lecture.plan}{10}{J}{ナイキストの安定判別法(安定余有)}%
\EdbColDef{edb:lecture.plan}{10}{E}{ナイキストの安定判別法(安定余有)}%
\EdbColDef{edb:lecture.plan}{11}{J}{制御系の構成(開ループ系と閉ループ系)}%
\EdbColDef{edb:lecture.plan}{11}{E}{制御系の構成(開ループ系と閉ループ系)}%
\EdbColDef{edb:lecture.plan}{12}{J}{制御系の評価指標(定常特性と過渡特性)}%
\EdbColDef{edb:lecture.plan}{12}{E}{制御系の評価指標(定常特性と過渡特性)}%
\EdbColDef{edb:lecture.plan}{13}{J}{制御系の設計(特性評価とゲイン調整)}%
\EdbColDef{edb:lecture.plan}{13}{E}{制御系の設計(特性評価とゲイン調整)}%
\EdbColDef{edb:lecture.plan}{14}{J}{制御系の設計(位相遅れ補償と位相進み補償)}%
\EdbColDef{edb:lecture.plan}{14}{E}{制御系の設計(位相遅れ補償と位相進み補償)}%
\EdbColDef{edb:lecture.plan}{15}{J}{制御系の設計(PID制御)}%
\EdbColDef{edb:lecture.plan}{15}{E}{制御系の設計(PID制御)}%
\EdbColDef{edb:lecture.plan}{16}{J}{期末試験}%
\EdbColDef{edb:lecture.plan}{16}{E}{期末試験}%
\EdbColDef{edb:lecture.jabeeevaluation}{1}{J}{}%
\EdbColDef{edb:lecture.jabeeevaluation}{1}{E}{}%
\EdbColDef{edb:lecture.jabeerelation}{1}{J}{(D)専門基礎30\%，(E)[主目標]専門分野(電気電子システム)70\%}%
\EdbColDef{edb:lecture.jabeerelation}{1}{E}{(D)専門基礎30\%，(E)[主目標]専門分野(電気電子システム)70\%}%
\EdbColDef{edb:lecture.unit}{1}{J}{2}%
\EdbColDef{edb:lecture.unit}{1}{E}{2}%
\EdbColDef{edb:lecture.target}{1}{J}{伝達関数法に基づき，周波数応答法による表示法と安定判別法および制御系の設計法の基礎を理解修得させる．}%
\EdbColDef{edb:lecture.target}{1}{E}{伝達関数法に基づき，周波数応答法による表示法と安定判別法および制御系の設計法の基礎を理解修得させる．}%
\EdbColDef{edb:lecture.outline}{1}{J}{本講では，周波数応答法を基礎とする安定判別法およびフィードバック制御系の設計法について講述する．}%
\EdbColDef{edb:lecture.outline}{1}{E}{本講では，周波数応答法を基礎とする安定判別法およびフィードバック制御系の設計法について講述する．}%
\EdbColDef{edb:lecture.keyword}{1}{J}{周波数応答}%
\EdbColDef{edb:lecture.keyword}{1}{E}{Frequency Response}%
\EdbColDef{edb:lecture.keyword}{2}{J}{制御系設計}%
\EdbColDef{edb:lecture.keyword}{2}{E}{Control System Design}%
\EdbColDef{edb:lecture.foundation}{1}{@}{215953}%
\EdbColDef{edb:lecture.foundation}{1}{J}{\EdbSeeLecture{システム基礎}{215474}{215953}{1.0}}%
\EdbColDef{edb:lecture.foundation}{1}{E}{\EdbSeeLecture{Basic Theory of Systems}{215474}{215953}{1.0}}%
\EdbColDef{edb:lecture.foundation}{2}{@}{216169}%
\EdbColDef{edb:lecture.foundation}{2}{J}{\EdbSeeLecture{電気回路1$\cdot{}$演習}{215474}{216169}{1.0}}%
\EdbColDef{edb:lecture.foundation}{2}{E}{\EdbSeeLecture{Electrical Circuit Theory (I) and Exercise}{215474}{216169}{1.0}}%
\EdbColDef{edb:lecture.foundation}{3}{@}{216172}%
\EdbColDef{edb:lecture.foundation}{3}{J}{\EdbSeeLecture{電気回路2$\cdot{}$演習}{215474}{216172}{1.0}}%
\EdbColDef{edb:lecture.foundation}{3}{E}{\EdbSeeLecture{Electrical Circuit Theory (II) and Exercise}{215474}{216172}{1.0}}%
\EdbColDef{edb:lecture.relation}{1}{@}{215737}%
\EdbColDef{edb:lecture.relation}{1}{J}{\EdbSeeLecture{過渡現象}{215474}{215737}{0.5}}%
\EdbColDef{edb:lecture.relation}{1}{E}{\EdbSeeLecture{Transient Analysis}{215474}{215737}{0.5}}%
\EdbColDef{edb:lecture.requirement}{1}{J}{「システム基礎」をはじめとして「電気回路1，2」，「過渡現象」等の基礎科目を修得していることが望ましい．}%
\EdbColDef{edb:lecture.requirement}{1}{E}{「システム基礎」をはじめとして「電気回路1，2」，「過渡現象」等の基礎科目を修得していることが望ましい．}%
\EdbColDef{edb:lecture.notice}{1}{J}{予習，復習を十分行うこと．}%
\EdbColDef{edb:lecture.notice}{1}{E}{予習，復習を十分行うこと．}%
\EdbColDef{edb:lecture.evaluation}{1}{J}{試験80\%(中間試験40\%，期末試験40\%)，平常点20\%(レポート等)として評価し，総合60\%以上で合格とする．}%
\EdbColDef{edb:lecture.evaluation}{1}{E}{試験80\%(中間試験40\%，期末試験40\%)，平常点20\%(レポート等)として評価し，総合60\%以上で合格とする．}%
\EdbColDef{edb:lecture.student}{1}{@}{12628}%
\EdbColDef{edb:lecture.student}{1}{J}{開講コース学生のみ履修可能}%
\EdbColDef{edb:lecture.student}{1}{E}{Able to be taken by only specified class(es)}%
\EdbColDef{edb:lecture.textbook}{1}{J}{西村編「制御工学」森北出版株式会社}%
\EdbColDef{edb:lecture.textbook}{1}{E}{西村編「制御工学」森北出版株式会社}%
\EdbColDef{edb:lecture.reference}{1}{J}{制御理論のテキストは多数出版されており，いずれを参考にしても良い．}%
\EdbColDef{edb:lecture.reference}{1}{E}{制御理論のテキストは多数出版されており，いずれを参考にしても良い．}%
\EdbColDef{edb:lecture.note}{1}{J}{教科書の章末問題を各自解いておくこと．}%
\EdbColDef{edb:lecture.note}{1}{E}{教科書の章末問題を各自解いておくこと．}%
\EdbColDef{edb:lecture.note}{2}{J}{授業を受ける際には，2時間の授業時間毎に2時間の予習と2時間の復習をしたうえで授業を受けることが，授業の理解と単位取得のために必要である．}%
\EdbColDef{edb:lecture.note}{2}{E}{授業を受ける際には，2時間の授業時間毎に2時間の予習と2時間の復習をしたうえで授業を受けることが，授業の理解と単位取得のために必要である．}%
\EdbColDef{edb:lecture.contact}{1}{E}{\連絡先個人{\EdbEMAIL{yasuno@ee.tokushima-u.ac.jp}{y{\HZSp[1]}a{\HZSp[1]}s{\HZSp[1]}u{\HZSp[1]}n{\HZSp[1]}o{\HZSp[1]}@{\HZSp[1]}e{\HZSp[1]}e{\HZSp[1]}.{\HZSp[1]}t{\HZSp[1]}o{\HZSp[1]}k{\HZSp[1]}u{\HZSp[1]}s{\HZSp[1]}h{\HZSp[1]}i{\HZSp[1]}m{\HZSp[1]}a{\HZSp[1]}-{\HZSp[1]}u{\HZSp[1]}.{\HZSp[1]}a{\HZSp[1]}c{\HZSp[1]}.{\HZSp[1]}j{\HZSp[1]}p}}{Yasuno (E棟2階北 B-5, +81-88-656-7458, \EdbEMAIL{yasuno@ee.tokushima-u.ac.jp}{y{\HZSp[1]}a{\HZSp[1]}s{\HZSp[1]}u{\HZSp[1]}n{\HZSp[1]}o{\HZSp[1]}@{\HZSp[1]}e{\HZSp[1]}e{\HZSp[1]}.{\HZSp[1]}t{\HZSp[1]}o{\HZSp[1]}k{\HZSp[1]}u{\HZSp[1]}s{\HZSp[1]}h{\HZSp[1]}i{\HZSp[1]}m{\HZSp[1]}a{\HZSp[1]}-{\HZSp[1]}u{\HZSp[1]}.{\HZSp[1]}a{\HZSp[1]}c{\HZSp[1]}.{\HZSp[1]}j{\HZSp[1]}p})}{}}%
\end{edb:lecture}%

\end{document}
